\thispagestyle{empty}

\begin{flushright}

\flushright \scalebox{2.5}{\sffamily{\textbf{Software InVesalius}}}
\par
\vspace{180pt}
\scalebox{2.8}{\sffamily User Guide}
\ThisLLCornerWallPaper{1}{capa2.png}

\begin{figure}[h!]
\flushright 
\includegraphics[scale=0.5, bb = 0 0 300 601]{logo_cti.jpg}
\end{figure}		

\end{flushright}